\documentclass[a4paper,12pt]{article}
\usepackage[a4paper, total={180mm, 272mm}]{geometry}

\usepackage{fontspec}
\setmainfont[Path=fonts/, Extension=.ttf]{ipaexm}

\setlength\parindent{3.5em}
\setlength\parskip{0em}
\renewcommand{\baselinestretch}{1.247}

\begin{document}

\thispagestyle{empty}

\Large
\noindent \\
Density Ino\medskip
\par
\normalsize
Adjusts the density of a semi-transparent image.\par
It allows to emphasize streamlined touch effects.\par
The Alpha channel requires semi-transparent values.\\
\\
-{-}- \ Inputs \ -{-}-\\
Source\par
Connect the image to be processed.\\
Reference\par
Connect the reference image to assign the strength of the effect into each pixel.\\
\\
-{-}- \ Settings \ -{-}-\\
Density\par
Specifies the density.\par
The density will change with the semi-transparent pixels of the image.\par
Specify a value greater than or equal to 0. The maximum is 10.\par
A value greater than 1, will make the image more opaque.\par
While at 1 it will not change the original density of the image.\par
When values are greater than 0 and smaller than 1, the image will be semi-transparent.\par
If the value is 0, the image will disappear.\par
The default value is 1.\\
\\
Reference\par
Choose how the Reference image values are used to set the strength of the effect\par 
into each pixel.\par
Choose from Red/Green/Blue/Alpha/Luminance.\par
Choose Nothing to disable the effect.\par
The default value is Red.

\end{document}