\documentclass[a4paper,12pt]{article}
\usepackage[a4paper, total={180mm, 272mm}]{geometry}

\usepackage{fontspec}
\setmainfont[Path=fonts/, Extension=.ttf]{ipaexm}

\setlength\parindent{3.5em}
\setlength\parskip{0em}
\renewcommand{\baselinestretch}{1.247}

\begin{document}

\thispagestyle{empty}

\Large
\noindent \\
Blur Ino\medskip
\par
\normalsize
Blurs the image.\par
The method used for the blurring is a Gaussian distribution.\par
Therefore, there is no directional result in the image.\\
\par
The image alpha channel will be taken into account.\\
\\
-{-}- \ Inputs \ -{-}-\\
Source\par
Connect the image to be processed.\\
\\
Reference\par
Connect the reference image to assign the strength of the effect into each pixel.\\
\\
-{-}- \ Settings \ -{-}-\\
Radius\par
Specifies the radius of the blur.\par
The unit used is mm.\\
\\
Reference\par
Choose how the Reference image values are used to set the strength of the effect\par 
into each pixel.\par
Choose from Red/Green/Blue/Alpha/Luminance.\par
Choose Nothing to disable the effect.\par
The default value is Red.

\end{document}