\documentclass[a4paper,12pt]{article}
\usepackage[a4paper, total={180mm, 272mm}]{geometry}

\usepackage{fontspec}
\setmainfont[Path=fonts/, Extension=.ttf]{ipaexm}

\setlength\parindent{3.5em}
\setlength\parskip{0em}
\renewcommand{\baselinestretch}{1.247}

\begin{document}

\thispagestyle{empty}

\Large
\noindent \\
Blur Ino\medskip
\par
\normalsize
Blurs the image.\\
\par
We use a Gaussian distribution, for the blur method.\par
Therefore, there is no directional result in the image.\\
\par
Alpha channel will be processed.\\
\\
-{-}- \ Inputs \ -{-}-\\
Source\par
Connect the image to process.\\
\\
Reference\par
Connect the reference image to put the strength of the effect into each Pixel.\\
\\
-{-}- \ Settings \ -{-}-\\
Radius\par
Specifies the radius of the blur.\par
The unit is mm.\\
\\
Reference\par
Choose how Reference image values put the strength of the effect into each Pixel.\par
An image is connected to the \textquotedbl Reference\textquotedbl \ of the input,\par
Choose from Red/Green/Blue/Alpha/Luminance/Nothing.\par
Choose Nothing when you do not want this effect, it will turn off the connection.\par
The default setting is Red.

\end{document}