\documentclass[a4paper,12pt]{article}
\usepackage[a4paper, total={180mm, 272mm}]{geometry}

\usepackage{fontspec}
\setmainfont[Path=fonts/, Extension=.ttf]{ipaexm}

\setlength\parindent{3.5em}
\setlength\parskip{0em}
\renewcommand{\baselinestretch}{1.247}

\begin{document}

\thispagestyle{empty}

\Large
\noindent \\
Linear Dodge Ino\medskip
\par
\normalsize
Linear dodge the image\par
Add to the total brightness\par
Formula = Back + Fore \ \ ※ Alpha with RGB ADD difference from semi-transparent\\
\\
-{-}- \ Inputs \ -{-}-\par
Both the connections are combined in the process.\par
When the operating switch is OFF it displays the Back.\par
It will also display if there is only one connection.\\
Fore\par
Connect the image to overlay on top.\\
Back\par
Connect the image to put below.\\
\\
-{-}- \ Settings \ -{-}-\\
Opacity\par
Specifies the opacity of the image overlaid on top.\par
When 0 the Fore image will be transparent.\par
The default value is \textquotedbl 1.0\textquotedbl \ for the Fore image and will be synthesized as opaque.\par
Specify a value from 0 to 1.0.\\
\\
Clipping Mask\par
When ON,\par
Material will not exist in the location (Back) (Alpha Value Zero), and remains clear.\par
The default setting is ON.

\end{document}