\documentclass[a4paper,12pt]{article}
\usepackage[a4paper, total={180mm, 272mm}]{geometry}

\usepackage{fontspec}
\setmainfont[Path=fonts/, Extension=.ttf]{ipaexm}

\setlength\parindent{3.5em}
\setlength\parskip{0em}
\renewcommand{\baselinestretch}{1.247}

\begin{document}

\thispagestyle{empty}

\Large
\noindent \\
PN Clouds Ino\medskip
\par
\normalsize
Generates a cloud pattern image.\\
\par
The pixel values of the noise will be centered at:\par
\noindent \hskip 7em \ \ 8bits Image: 128 (0x80)\par
\noindent \hskip 7em 16bits Image: 32768 (0x8000)\par
Note that larger and smaller values are not necessarily even.\\
\\
-{-}- \ Settings \ -{-}-\\
Size\par
Defines the size of the pattern.\par
Smaller values result in a smaller pattern, bigger ones in a bigger pattern.\par
The unit is mm.\par
The default value is 10.\\
\\
Z\par
Allows for changing the pattern over time.\par
For example, from frame 1 to 24 it can change from 0 to 1.\par
The default value is 0.\\
\\
Octaves\par
Defines the detail level for the cloud pattern.\par
Specify an integer from 1 to 10.\par
With higher values there will be more detail in the noise.\par
The default value is 1.\\
\\
Persistance\par
Specify the strength of the noise in the cloud pattern.\\
\\
Alpha Rendering\par
When inactive it fills in the maximum Alpha value, so the entire image will be opaque.\par
When active, it feeds the same image in the Alpha channel, as in the RGB channels.\par
The default setting is active.

\end{document}